Ordering HyperAct Products

For orders or information, please contact HyperAct at :

HyperAct, Inc.

3437 335th Street

West Des Moines, IA 50266 USA

Tel/Fax  (515) 987-2910

Fax only (515) 987-2909

CIS - 76350,333 or 102703,3274

Internet - rhalevi@hyperact.com

World Wide Web - http://www.hyperact.com/